%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Angeluts_etal2014} Angeluts, A. A., Bezotosnyi, V. V., Cheshev, E. A., Goltsman, G. N., Finkel, M. I., Seliverstov, S. V., et al. (2014). Compact 1.64 THz source based on a dual-wavelength diode end-pumped Nd:YLF laser with a nearly semiconfocal cavity. \textit{Laser Phys. Lett.}, \textit{11}(1), 015004 (1 to 4).

\end{thebibliography}

\end{document}

