%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Ferrari_etal2019} Ferrari, S., Kovalyuk, V., Vetter, A., Lee, C., Rockstuhl, C., Semenov, A., et al. (2019). Analysis of the detection response of waveguide-integrated superconducting nanowire single-photon detectors at high count rate. \textit{Appl. Phys. Lett.}, \textit{115}(10), 101104.

\end{thebibliography}

\end{document}

