%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Goltsman_etal2016} Goltsman, G. N., Shcherbatenko, M. L., Lobanov, Y. V., Kovalyuk, V. V., Kahl, O., Ferrari, S., et al. (2016). Superconducting nanowire single photon detector for coherent detection of weak optical signals. In \textit{LPHYS{\textquoteright}16} (pp. 1--2).

\end{thebibliography}

\end{document}

