%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Elezov_etal2018} Elezov, M. S., Scherbatenko, M. L., Sych, D. V., \& Goltsman, G. N. (2018). Active and passive phase stabilization for the all-fiber Michelson interferometer. In \textit{J. Phys.: Conf. Ser.} (Vol. 1124, 051014 (1 to 5)).

\end{thebibliography}

\end{document}

