%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Zhang_etal2013} Zhang, W., Miao, W., Li, S. L., Zhou, K. M., Shi, S. C., Gao, J. R., et al. (2013). Measurement of the spectral response of spiral-antenna coupled superconducting hot electron bolometers. \textit{IEEE Trans. Appl. Supercond.}, \textit{23}(3), 2300804.

\end{thebibliography}

\end{document}

