%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Dauler_etal2007} Dauler, E. A., Robinson, B. S., Kerman, A. J., Yang, J. K. W., Rosfjord, E. K. M., Anant, V., et al. (2007). Multi-element superconducting nanowire single-photon detector. \textit{IEEE Trans. Appl. Supercond.}, \textit{17}(2), 279--284.

\end{thebibliography}

\end{document}

