%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Rosfjord_etal2006} Rosfjord, K. M., Yang, J. K. W., Dauler, E. A., Anant, V., Berggren, K. K., Kerman, A. J., et al. (2006). Increased detection efficiencies of nanowire single-photon detectors by integration of an optical cavity and anti-reflection coating. In \textit{CLEO/QELS} (JTuF2 (1 to 2)).

\end{thebibliography}

\end{document}

