%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Kerman_etal2006} Kerman, A. J., Dauler, E. A., Keicher, W. E., Yang, J. K. W., Berggren, K. K., Gol{\textquoteright}tsman, G., et al. (2006). Kinetic-inductance-limited reset time of superconducting nanowire photon counters. \textit{Appl. Phys. Lett.}, \textit{88}(11), 111116 (1 to 3).

\end{thebibliography}

\end{document}

