%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Jiang_etal2005} Jiang, L., Zhang, W., Yao, Q. J., Lin, Z. H., Li, J., Shi, S. C., et al. (2005). Characterization of a quasi-optical NbN superconducting hot-electron bolometer mixer. In \textit{Proc. PIERS} (Vol. 1, pp. 587--590).

\end{thebibliography}

\end{document}

