%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Hubers_etal2004} Hubers, H. - W., Semenov, A., Richter, H., Schwarz, M., Gunther, B., Smirnov, K., et al. (2004). Heterodyne receiver for 3-5 THz with hot-electron bolometer mixer. In J. Zmuidzinas, W. S. Holland, \& S. Withington (Eds.), \textit{Proc. SPIE} (Vol. 5498, pp. 579--586). SPIE.

\end{thebibliography}

\end{document}

