%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Korneev_etal2003} Korneev, A., Lipatov, A., Okunev, O., Chulkova, G., Smirnov, K., Gol{\textquoteright}tsman, G., et al. (2003). GHz counting rate NbN single-photon detector for IR diagnostics of VLSI CMOS circuits. \textit{Microelectronic Engineering}, \textit{69}(2-4), 274--278.

\end{thebibliography}

\end{document}

