%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Svechnikov_etal2001} Svechnikov, S. I., Antipov, S. V., Vakhtomin, Y. B., Goltsman, G. N., Gershenzon, E. M., Cherednichenko, S. I., et al. (2001). Conversion and noise bandwidths of terahertz NbN hot-electron bolometer mixers. \textit{Physics of Vibrations}, \textit{9}(3), 205--210.

\end{thebibliography}

\end{document}

