%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Menshchikov_etal1997} Men{\textquoteright}shchikov, E. M., Gogidze, I. G., Sergeev, A. V., Elant{\textquoteright}ev, A. I., Kuminov, P. B., Gol{\textquoteright}tsman, G. N., et al. (1997). Superconducting fast detector based on the nonequilibrium inductance response of a film of niobium nitride. \textit{Tech. Phys. Lett.}, \textit{23}(6), 486--488.

\end{thebibliography}

\end{document}

