%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Gousev_etal1996} Gousev, Y. P., Gol{\textquoteright}tsman, G. N., Karasik, B. S., Gershenzon, E. M., Semenov, A. D., Barowski, H. S., et al. (1996). Quasioptical superconducting hot electron bolometer for submillmeter waves. \textit{Int. J. of Infrared and Millimeter Waves}, \textit{17}(2), 317--331.

\end{thebibliography}

\end{document}

