%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Danerud_etal1994} Danerud, M., Winkler, D., Lindgren, M., Zorin, M., Trifonov, V., Karasik, B., et al. (1994). A fast infrared detector based on patterned YBCO thin film. \textit{Supercond. Sci. Technol.}, \textit{7}(5), 321--323.

\end{thebibliography}

\end{document}

