%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Yagoubov_etal2005} Yagoubov, P., van de Stadt, H., Hoogeveen, R., Koshelets, V., Birk, M., \& Murk, A. (2005). OPTICAL DESIGN OF SUB-MILLIMETER SPECTROMETER FOR LIMB SOUNDER. \textit{International Symposium on Space Terahertz Technology}, .

\end{thebibliography}

\end{document}

