%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Abbas_etal1977} Abbas, M. M., Mumma, M. J., Kostiuk, T., \& Buhl, D. (1977). Sensitivity limits of an infrared heterodyne spectrometer for astrophysical applications: errata. \textit{Appl. Opt.}, \textit{16}(11), 2793.

\end{thebibliography}

\end{document}

