%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Nebosis_etal1996} Nebosis, R. S., Semenov, A. D., Gousev, Y. P., \& Renk, K. F. (1996). Rigorous analysis of a superconducting hot-electron bolometer mixer: theory and comparision with experiment. In \textit{Proc. 7$^{th}$ Int. Symp. Space Terahertz Technol.} (pp. 601--613). Charlottesville, Virginia, USA.

\end{thebibliography}

\end{document}

