%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Kerman_etal2009} Kerman, A. J., Yang, J. K. W., Molnar, R. J., Dauler, E. A., \& Berggren, K. K. (2009). Electrothermal feedback in superconducting nanowire single-photon detectors. \textit{Phys. Rev. B}, \textit{79}(10), 4.

\end{thebibliography}

\end{document}

