%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Hajenius_etal2005} Hajenius, M., Barends, R., Gao, J. R., Klapwijk, T. M., Baselmans, J. J. A., Baryshev, A., et al. (2005). Local resistivity and the current-voltage characteristics of hot electron bolometer mixers. \textit{IEEE Trans. Appl. Supercond.}, \textit{15}(2), 495--498.

\end{thebibliography}

\end{document}

