%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{2016}

Krause S, Mityashkin V, Antipov S, Gol{\textquoteright}tsman G, Meledin D, Desmaris V, et al. Study of IF bandwidth of NbN hot electron bolometers on GaN buffer layer using a direct measurement method. In: Proc. 27$^{th}$ Int. Symp. Space Terahertz Technol.; 2016. p. 30--2.

\end{document}

