%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{2006}

Svechnikov SI, Finkel MI, Maslennikov SN, Vachtomin YB, Smirnov KV, Seleznev VA, et al. Superconducting hot electron bolometer mixer for middle IR range. In: Proc. 16th Int. Crimean Microwave and Telecommunication Technology. Vol 2.; 2006. p. 686--7.

\end{document}

