%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{2013}

Lusche R, Semenov A, Huebers H-W, Ilin K, Siegel M, Korneeva Y, et al. Effect of the wire geometry and an externally applied magnetic field on the detection efficiency of superconducting nanowire single-photon detectors [abstract]. In: INIS. Vol 46.; 2013. p. 1--3.

\end{document}

