%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{2005}

Baubert J, Salez M, Merkel H, Pons P, Cherednichenko S, Lecomte B, et al. IF gain bandwidth of membrane-based NbN hot electron bolometers for SHAHIRA. IEEE Trans Appl Supercond. 2005;15(2):507--10.

\end{document}

