%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{1998}

Blundell R, Kawamura JH, Tong CE, Papa DC, Hunter TR, Gol{\textquoteright}tsman GN, et al. A hot-electron bolometer mixer receiver for the 680-830 GHz frequency range. In: Proc. 6-th Int. Conf. Terahertz Electron. IEEE; 1998. p. 18--20.

\end{document}

