%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{1996}

Karasik BS, Elantiev AI. Noise temperature limit of a superconducting hot-electron bolometer mixer. Appl Phys Lett. 1996;68(6):853--5.

\end{document}

