%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{1998}

Brown RL. Technical specification of the Millimeter Array. In: Phillips TG, editor. Proc. SPIE, Advanced Technology MMW, Radio, and Terahertz Telescopes, vol. 3357.; 1998. p. 231--7.

\end{document}

