%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{1983}

Rothermel H, K{\"a}ufl HU, Yu Y. A heterodyne spectrometer for astronomical measurements at 10 micrometers. A\&A. 1983;126:387--92.

\end{document}

