%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{1977}

Abbas MM, Mumma MJ, Kostiuk T, Buhl D. Sensitivity limits of an infrared heterodyne spectrometer for astrophysical applications: errata. Appl Opt. 1977;16(11):2793.

\end{document}

