%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{2007}

Cherednichenko S, Drakinskiy V, Berg T, Kollberg EL, Angelov I. The direct detection effect in the hot-electron bolometer mixer sensitivity calibration. IEEE Trans. Microw. Theory Techn.. 2007;55(3):504--10.

\end{document}

