%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{1968}

Hocker LO, Sokoloff DR, Daneu V, Szoke A, Javan A. Frequency mixing in the infrared and far-infrared using a metal-to-metal point contact diode. Appl Phys Lett. 1968;12(12).

\end{document}

