%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\section*{2000}

Hoevers HFC, Bento AC, Bruijn MP, Gottardi L, Korevaar MAN, Mels WA, et al. Thermal fluctuation noise in a voltage biased superconducting transition edge thermometer. Appl Phys Lett. 2000;77(26):4421--4.

\end{document}

