%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Kovalyuk_etal2017} Kovalyuk V, Ferrari S, Kahl O, Semenov A, Lobanov Y, Shcherbatenko M, et al. Waveguide integrated superconducting single-photon detector for on-chip quantum and spectral photonic application. In: J. Phys.: Conf. Ser. Vol 917.; 2017. 062032.

\end{thebibliography}

\end{document}

