%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Johnson_etal1974} Johnson MA, Betz AL, Townes CH. 10-μm Heterodyne Stellar Interferometer. Phys. Rev. Lett.. 1974;33(27):1617--20.

\end{thebibliography}

\end{document}

