%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Angeluts_etal2014} Angeluts AA, Bezotosnyi VV, Cheshev EA, Goltsman GN, Finkel MI, Seliverstov SV, et al. Compact 1.64 THz source based on a dual-wavelength diode end-pumped Nd:YLF laser with a nearly semiconfocal cavity. Laser Phys. Lett.. 2014;11(1):015004 (1 to 4).

\end{thebibliography}

\end{document}

