%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Goltsman_etal2016} Goltsman GN, Shcherbatenko ML, Lobanov YV, Kovalyuk VV, Kahl O, Ferrari S, et al. Superconducting nanowire single photon detector for coherent detection of weak optical signals [abstract]. In: LPHYS{\textquoteright}16.; 2016. p. 1--2.

\end{thebibliography}

\end{document}

