%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Fedorov_etal2018} Fedorov G, Gayduchenko I, Titova N, Moskotin M, Obraztsova E, Rybin M, et al. Graphene-based lateral Schottky diodes for detecting terahertz radiation. In: Berghmans F, Mignani AG, editors. Proc. Optical Sensing and Detection V. Vol 10680. Spie; 2018. p. 30--9.

\end{thebibliography}

\end{document}

