%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Tretyakov_etal2018} Tretyakov I, Kaurova N, Voronov BM, Goltsman GN. About effect of the temperature operating conditions on the noise temperature and noise bandwidth of the terahertz range NbN hot-electron bolometers [abstract]. In: Proc. 29$^{th}$ Int. Symp. Space Terahertz Technol.; 2018. 113.

\end{thebibliography}

\end{document}

