%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Krause_etal2017} Krause S, Mityashkin V, Antipov S, Gol{\textquoteright}tsman G, Meledin D, Desmaris V, et al. Reduction of phonon escape time for nbn hot electron bolometers by using gan buffer layers. IEEE Trans Terahertz Sci Technol. 2017;7(1):53--9.

\end{thebibliography}

\end{document}

