%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Lusche_etal2014} Lusche R, Semenov A, Ilin K, Siegel M, Korneeva Y, Trifonov A, et al. Effect of the wire width on the intrinsic detection efficiency of superconducting-nanowire single-photon detectors. J Appl Phys. 2014;116(4):043906 (1 to 9).

\end{thebibliography}

\end{document}

