%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Kerman_etal2007} Kerman AJ, Dauler EA, Yang JKW, Rosfjord KM, Anant V, Berggren KK, et al. Constriction-limited detection efficiency of superconducting nanowire single-photon detectors. Appl Phys Lett. 2007;90(10):101110 (1 to 3).

\end{thebibliography}

\end{document}

