%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Korneev_etal2003} Korneev A, Lipatov A, Okunev O, Chulkova G, Smirnov K, Gol{\textquoteright}tsman G, et al. GHz counting rate NbN single-photon detector for IR diagnostics of VLSI CMOS circuits. Microelectronic Engineering. 2003;69(2-4):274--8.

\end{thebibliography}

\end{document}

