%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Teich1970} Teich MC. Chapter 9. Coherent detection in the infrared. NY: Academic Press Inc.; 1970. p. 361--407. (Semiconductors and semimetals; vol 5).

\end{thebibliography}

\end{document}

