%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Shurakov_etal2012} Shurakov A, Seliverstov S, Kaurova N, Finkel M, Voronov B, Goltsman G. Input bandwidth of hot electron bolometer with spiral antenna. IEEE Trans THz Sci Technol. 2012;2(4):400--5.

\end{thebibliography}

\end{document}

