%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Zhang_etal2014} Zhang W, Miao W, Zhong JQ, Shi SC, Hayton DJ, Vercruyssen N, et al. Temperature dependence of the receiver noise temperature and IF bandwidth of superconducting hot electron bolometer mixers. Supercond Sci Technol. 2014;27(8):085013 (1 to 5).

\end{thebibliography}

\end{document}

