%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Kerman_etal2006} Kerman AJ, Dauler EA, Keicher WE, Yang JKW, Berggren KK, Gol{\textquoteright}tsman G, et al. Kinetic-inductance-limited reset time of superconducting nanowire photon counters. Appl Phys Lett. 2006;88(11):111116 (1 to 3).

\end{thebibliography}

\end{document}

