%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Slysz_etal2004} Slysz W, Wegrzecki M, Papis E, Gol{\textquoteright}tsman GN, Verevkin A, Sobolewski R. A method of optimization of the NbN superconducting single-photon detector. Vol 36.; 2004.

\end{thebibliography}

\end{document}

