%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Antipov_etal2001} Antipov SV, Svechnikov SI, Smirnov KV, Vakhtomin YB, Finkel MI, Goltsman GN, et al. Noise temperature of quasioptical NbN hot electron bolometer mixers at 900 GHz. Physics of Vibrations. 2001;9(4):242--5.

\end{thebibliography}

\end{document}

