%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Semenov_etal1997} Semenov AD, Heusinger MA, Renk KF, Menschikov E, Sergeev AV, Elant{\textquoteright}ev AI, et al. Influence of phonon trapping on the performance of NbN kinetic inductance detectors. IEEE Trans Appl Supercond. 1997;7(2):3083--6.

\end{thebibliography}

\end{document}

