%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Sergeev_etal1994} Sergeev AV, Semenov AD, Kouminov P, Trifonov V, Goghidze IG, Karasik BS, et al. Transparency of a YBa2Cu3O7-film/substrate interface for thermal phonons measured by means of voltage response to radiation. Phys Rev B Condens Matter. 1994;49(13):9091--6.

\end{thebibliography}

\end{document}

